From b017b14c0ec6d327e061a1f96209e19fdc59885a Mon Sep 17 00:00:00 2001
From: erik <erik>
Date: Mon, 05 Feb 2007 20:18:36 +0000
Subject: BUG: My change to a switch statement made opie-gutenbrowser uncompilable.

FIX: The code there is just strange. I tore out the switch statement and
replaced it with a simple if block instead.
---
(limited to 'development/pim/dbpaper/rel.tex')

--
cgit v0.9.0.2
