From 18cae99f1deb15213074a8fb96f79eae4b0c5a43 Mon Sep 17 00:00:00 2001
From: zecke <zecke>
Date: Fri, 29 Aug 2003 18:04:43 +0000
Subject: Patch provided by mithro

I've included 2 patches need to make opie support on the fly screen
 resolution changing. This is done with the following,

 qcop "QPE/System" "setCurrentMode(int,int,int)" 480 640 16

 This is good for running applications in compatibility mode on the C700.
 As you can see there isn't much to these patches.
---
(limited to 'development/pim/dbpaper/dbpimpaper.tex')

--
cgit v0.9.0.2
