From c6d96c514c58b288ac0bc8f844db35123bcaf2ad Mon Sep 17 00:00:00 2001
From: eilers <eilers>
Date: Fri, 08 Aug 2003 15:13:30 +0000
Subject: Added support for C 750 (Shepherd):

Device is detected and sounds for keypress, screentap and alarm is working (using the
sound device)
Attention: Please don't activate the screentab sound. It has some quirks..
---
(limited to 'development/pim/dbpaper/interface.tex')

--
cgit v0.9.0.2
