From 422e7757feae169d8c931f2f0ac1d5acc201f846 Mon Sep 17 00:00:00 2001
From: zecke <zecke>
Date: Thu, 15 Jul 2004 22:35:55 +0000
Subject: When you've startet this application and the clicked

on its symbol you got a blank and unnamed widget.

This was the QMainWindow which was manually hidden, but then
raised by QPEApplication::raiseAppropriate. Now soleley use
QPEApplication::showMainWidget and execDialog for showing the widget

TODO: CleanUp more and use quicklaunc technology
---
(limited to 'development/pim/dbpaper/tables.tex')

--
cgit v0.9.0.2
