From fa9e4fa0c51c30be12caf8b5c92d722b40509814 Mon Sep 17 00:00:00 2001
From: zecke <zecke>
Date: Sun, 19 Sep 2004 23:47:29 +0000
Subject: -Check m_model to allow suspending. ODevice doesn't suspend on UnknownModel

-Comments
-map 0-255 brightness to 0-100 for Assabat Frontlight Control
-Change return value for display on and off
---
(limited to 'development/pim/pimpaper/frontend.tex')

--
cgit v0.9.0.2
