From 3d5e5c098ccb686588380bc1f220beafbc5a6d76 Mon Sep 17 00:00:00 2001
From: zecke <zecke>
Date: Sun, 17 Apr 2005 13:56:34 +0000
Subject: Opie Player2 XINE update:

	-update xine code alphablend, yuv2rgb to be up to date
	-XINELib:
		-use the XINE infrastructure to change the gui width/height
		-use the XINE infrastructure to change the brightness
	-Update the NULL Video Driver:
		-make use of frame_dest_cb and and dest_size_cb (callback)
		 to update the size of the gui
		-use alphablend
		-merge the video_out_fb xine driver

	To Alwin: your testvideo now lockups op2. with valgrind I see
	it has to do with the yuv2rgb conversion methods
---
(limited to 'development/pim/pimpaper/introduction.tex')

--
cgit v0.9.0.2
