From 4564befecf3df38911d48f216ab216faf93b9c1d Mon Sep 17 00:00:00 2001
From: zecke <zecke>
Date: Sun, 19 Sep 2004 18:48:56 +0000
Subject: Have only one showDialog function.

If the dialog sizeHint is smaller than the width of the desktop
qpe_show_dialog didn't 'maximize' the widget and just showed it.
QPEApplication::showDialog does better in that respect but does not
have custom 'centering' of the dialog. But that doesn't matter
as we save/restore size and position for BigScreen.
---
(limited to 'development/pim/pimpaper/seperation.tex')

--
cgit v0.9.0.2
