\section{Introduction}

\subsection{This Document}
This paper will describe the design decision, our specification
and how it integrates into C++, Qt and Opie.
It will examine the separation between Frontend and Backend, delayed
loading of Records, the concrete XML, SQL and VCF implementation
of the Backend and finally, we will built a new Frontend/Backend
to support a Note based API.

\subsection{Copyright}

Copyright notice
\copyright 2004, Holger Hans Peter Freyther
